DESY 02 - 061 LC - DET - 2002 - 005 May 2002

SIMDET - Version 4 A Parametric Monte Carlo for a TESLA Detector

M. Pohl Université de Genève, Switzerland, and Katholieke Universiteit Nijmegen, The Netherlands

H.J. Schreiber DESY Zeuthen, Germany

Abstract

A new release of the parametric detector Monte Carlo program SIMDET (version 4.01) is now available. We describe the principles of operation and the usage of this program to simulate the response of a detector for the TESLA linear collider. The detector components are implemented according to the TESLA Technical Design Report. All detector component responses are treated in a realistic way using a parametrisation of results from the ab initio Monte Carlo program

BRAHMS. Pattern recognition is emulated using a complete cross reference between generated

particles and detector response. Also, for charged particles, the covariance matrix and dE/dx information are made available. An idealised energy flow algorithm defines the output of the program, consisting of particles generically classified as electrons, photons, muons, charged and neutral hadrons as well as unresolved clusters. The program parameters adjustable by the user are described in detail. User hooks inside the program and the output data structure are documented.

Introduction

Recently the Technical Design Report (TDR) for the superconducting linear collider TESLA [1] has been completed. A possible detector as laid out in the TDR will have to deal with a large dynamic range in energy, complexity of final states and signal-to-background ratio. In particular, the detector should be able to cover the following important physics goals:

• very good momentum resolution (δ1/p_T ∼ 4 · 10^{−5}/GeV in the central region) to measure e.g. the Z recoil mass in the Higgsstrahlung process e^+e^− → ZH/Z → ℓ^+ℓ^− with optimal precision;

• high resolution of hadronic jet energies (ΔE/E ≈ 30%/ √ E) to reconstruct multi-jet events;

• excellent b- and c-tagging capabilities to identify multi-b final states like ZHH or tt̄H and to separate H → bb̄, H → cc̄ and H → gg;

• good hermiticy to reduce background in missing energy channels; and

• measurement capabilities in the forward direction.

The detector version implemented in SIMDET is based on the description of the detector for the TESLA linear collider as presented in Part IV of the TDR [1]. It has been optimised for the physics requirements mentioned above. Its basic components are:

• a multi-layer micro-vertex detector;

• a tracker system with the main tracker as a large Time Projection Chamber (TPC), a silicon tracking subsystem between the vertex detector and the TPC and a set of forward chambers behind the TPC endplates;

• a tracking electromagnetic calorimeter with very fine three dimensional granularity;

• a hadronic calorimeter;

• and an instrumented mask with a small-angle luminosity detector.

Fig. 1 shows the principal layout of the TESLA detector and its dimensions. The tracking system and the calorimeters are situated inside a 4 T superconducting solenoid.

At TESLA a bunch train of ∼ 2800 bunches with more than 300 ns spacing makes bunch identification easy and no special detectors are needed for this purpose. Background expected is mostly due to e^+e^− pairs created in beam-beam interactions produced at the interaction point (IP). These pairs are concentrated at low polar angle and low transverse momentum. In order to absorb background related to low-angle pairs a mask in the forward direction is required which is also used for calorimetry. The pairs at large angles can be kept at low radius by a strong magnetic field. It limits the radius of the innermost vertex detector layer to 1.5 cm which ensures an acceptable background level.

The program SIMDET simulates the response of this detector for linear collider physics in a fast and user-friendly manner. The main objectives of the program are threefold:

Figure 1: View of one quadrant of the TESLA detector. Dimensions are in mm.

• it provides physics studies groups with a tool for evaluation of the physics potential of a linear collider;

• it treats the detector responds in a realistic manner using a parametrisation of results from the ab initio Monte Carlo program BRAHMS;

• it is fast and provides a simple output structure, so that physics studies can be done in a straight forward and decentralised way.

Only the ab initio GEANT3 [2] application program BRAHMS [3] provides detailed and realistic information for charged particle momenta and directions, impact parameters and calorimeter energies and directions. Simple parametrisations of their resolution functions are used as input for SIMDET. Gaussian smearing procedures then generate the detector response. Starting from version 3 of the program, a more accurate description of the calorimeter response has been derived from BRAHMS and a major upgrade of the program was the implementation of an energy flow algorithm to link tracker and calorimeter information. For this purpose, a simple and idealistic cluster algorithm is applied to the energy deposits in the calorimeters. Clusters and tracks are then linked to form energy flow objects. The ultimate pattern recognition is emulated using a complete cross reference between the calorimeter deposits and the particles originally generated. Energy flow objects are then classified as electrons, photons, muons, charged and neutral hadrons and clusters of unresolved particles using the Monte Carlo truth information. Also, if enabled, the covariance matrix for charged particles and dE/dx information are made available to the user. A new design of the instrumented mask and a low-angle luminosity calorimeter have been included into the default option of the detector, so that the program is significantly enhanced as far as flavour and particle identification capabilities and large angle coverage are concerned. The identification of a technology for the muon system has yet to be explored in a comprehensive way. The program SIMDET has been prepared for muon response simulation. At present, however, muons are assumed to be measured by the tracking device and identified applying a general misidentification probability.

The objects produced by the energy flow algorithm provide a consistent data structure at the output of the program. This data structure, as well as defined user hooks inside the program itself, can be used to perform physics studies either within SIMDET or by means of an analysis program after writing the energy flow objects to a file.

Furthermore, beamstrahlung based on parametrisations of Ref.[4] can be included, γγ hadronic background events can be overlayed to physical events [5] and an event display for reconstructed objects has been prepared [6]. Recently, a CLIC version of the program was initiated [7] to study the physics potential of an e^+e^− linear collider in the center-of-mass energy region of 3 TeV and beyond.

Detector response simulation

The anticipated particle physics program at TESLA, presented in detail in Part III of the TDR [1], represents a very demanding task for the detector. With such a detector the sensitivity for discovery and very high precision measurements over energies from the Z peak up to ∼ 1 TeV should be as large as possible, withstanding at the same time the background expected. In this section we describe the response of the individual TESLA detector components as implemented in the present version of SIMDET.

Ongoing and planned R&D activities for possible improvements or redesigns of detector components are not considered in this note and have to be accounted for in forthcoming SIMDET versions.

The tracker system

The concept of the tracking system is shown in Fig. 2. Excellent tracking of charged particles is achieved by a large Time Projection Chamber (TPC) as a main tracker, supplemented by a silicon tracking detector between the vertex detector (VTX) and the TPC, by discs in the forward region and by a forward chamber located behind the TPC endplate (FCH). The TPC design is similar to existing ones, as implemented in the ALEPH or STAR detectors. So as to not to compromise the momentum resolution and the calorimetric energy measurement, field cage and endplates will be designed as thin as possible. A TPC error of δ(1/p_T ) ≤ 2 · 10^{−4}/GeV for large polar angle tracks and σ(dE/dx) ≤ 5% are anticipated. The intermediate tracker consists of two layers of silicon strip detectors (SIT) in the barrel region down to θ = 25^∘ and three silicon pixel and four silicon strip layers (FTD) on either side in the forward region of the detector. Single point resolutions of 10 μm respectively 50 μm are assumed in the simulations for these detectors. The FCH, SIT and FTD improve significantly the momentum resolution for all polar angles and, in particular, the angle measurement capability in the very forward region below θ = 12^∘.

For the microvertex detector several technologies were proposed: CCDs, active pixel sensors

Figure 2: The tracking system of the TESLA detector.

(APS) and CMOS sensors. With the CCDs a point resolution of 3.5 μm and a layer thickness of 0.12 % of a radiation length can be reached. At present, the CCD detector version has been implemented in detail in the simulation program BRAHMS. Consequently, the same information is represented in SIMDET.

Using the overall tracking system, resolution functions for the inverse of the transverse momentum, polar and azimuthal angles as well as impact parameters as functions of momentum and polar angle θ are input to Gaussian smearing procedures. Interpolating between data points and extrapolation to not yet simulated regions, reasonable descriptions in the whole (p, θ)-plane have been obtained. Attention has been paid to ensure that the parametrised resolutions are in agreement within a few percent with the BRAHMS predictions. The inverse transverse momentum, the directions θ and ϕ and the impact parameter resolution parameters are smeared independently. Correlations between momenta and ϕ directions of tracks are neglected. An example of the BRAHMS simulated resolution functions for 20 GeV momentum tracks are shown in Fig. 3 as a function of polar angle.

The measured values thus obtained for 1/p_T , θ and ϕ can be transformed to p_x, p_y and p_z by means of the program package described in Ref. [8], including proper propagation of the measurement errors.

SIMDET offers to set a minimum transverse momentum for tracks, so that below that value

charged particles are removed from the event. Tracking efficiency and charge misinterpretation probability can also be specified. The track reconstruction efficiency is momentum dependent: it equals the (default) data card value for tracks with momentum above 2 GeV and becomes continuously smaller with decreasing track momentum. Charge misinterpretation according to the (default) data card value is only applied to large p_T tracks; this value is increased by a factor of three for badly measured particles. No attempt is currently made to take into account overlaps of closely spaced tracks.

Figure 3: Resolution plots for 20 GeV momentum tracks as simulated with BRAHMS.

The main element entering in the lifetime tagging is the impact parameter. The impact parameter in the (r − ϕ) plane is defined as the minimal distance between the primary vertex (PV) and the track trajectory projected onto the plane perpendicular to the beam direction. The point of closest approach (P_C ) of the track trajectory to the primary vertex in the (r − ϕ) plane is also used to define the (r − z) projection of the impact parameter. Then the (r − z) projection of the track impact parameter is the difference between the z-coordinates of the primary vertex and the point P_C .

Both impact parameters have a sign defined as follows. The point of closest approach of the track to the simulated flight direction is computed and the negative (positive) sign is set if this point is upstream (downstream) with respect to the primary vertex position. With this definition, tracks from decays of long-lived particles have predominantly positive signs while tracks coming directly from the PV are equally likely to be positive or negative due to the limited precision of track reconstruction.

For the CCD version of the vertex detector, all necessary input for sophisticated flavour identification exists in the form of a parametrised covariance matrix.

For the APS version of the vertex detector, GEANT3 simulations provide the impact parameter errors as follows:

σ_{rϕ} = A ⊕ B p sin^{32} θ (1) σ_{rz} = C ⊕ D p sin^{52} θ (2) for a track with momentum p and polar angle θ in the (r − ϕ) and the (r − z) projections. The values of the parameters A, B, C, and D were obtained from BRAHMS simulations and transmitted to SIMDET.

Calorimetric response and energy flow

The physics programme at a linear collider calls for calorimetry with unprecedented performance which can be translated into the following requirements:

• hermeticity down to very small angles,

• excellent energy resolution for jets respectively partons,

• excellent angular resolution,

• capability to reconstruct non-pointing photons as a stand-alone device,

• good time resolution, to avoid event pile-up.

Dense and hermetic sampling calorimeters with very high granularity realise at best these demands. In the TDR, two options are presented both for the electromagnetic (ECAL) and the hadronic (HCAL) calorimeter components. For the ECAL, the two options are a very high granularity 3D calorimeter based on tungsten and silicon diode pads and a shashlik (scintillator/lead) calorimeter as presented in the CDR [9]. Both versions have undergone a successful R&D program, detailed layout studies and careful implementations into the simulation program

BRAHMS.

For the HCAL, the two suggestios are an Fe/scintillating tile calorimeter with fine transverse and longitudinal segmentations and a fully digital calorimeter, which represents a novel approach to hadronic calorimetry. It consists of fine pixels (1×1cm^2) for an iron/gas sandwhich that is read-out digitally (yes/no) for each cell.

In Version 4 of SIMDET, the tungsten/silicon option for the electromagnetic component and the Fe/scintillating tile option for the HCAL are implemented.

The simulation of the calorimetric response to hadrons and leptons has been updated to correspond more closely to the expected performance of the TESLA calorimeters as described in the Technical Design Report. The excellent energy resolutions for single electrons and photons at high energies are shown in Fig. 4, the energy resolution for hadrons in Fig. 5. Both resolution curves have have been determined using ab initio simulations of the baseline electromagnetic and hadronic calorimeters as implemented in BRAHMS. They agree well with the resolutions quoted in the TESLA Technical Design Report[1]. These resolution curves are implemented in the current version of SIMDET.

Figure 4: Relative energy resolution as a function of energy for single high energy electrons as simulated with BRAHMS.

On the other hand, no attempt has been made to simulate the benefits expected from the extremely fine three-dimensional granularity of the silicon tungsten calorimeter. Consequently, also the subsequent cluster algorithm sticks to the simple two-dimensional tower geometry used in the previous version of the program. Users who require a more accurate simulation of the spatial energy deposit or more sophisticated pattern recognition in the calorimeters should directly use

BRAHMS for their study.

The energy flow output implemented in the present version of SIMDET which was left unchanged with respect to Version 3 [10], thus does not fully benefit from the superb pattern recognition capabilities of the tracking calorimeter. Nevertheless, as demonstrated in Fig. 6, usage of the energy flow concept leads to a vast improvement in the reconstruction of the visible and missing energy.

Figure 5: Relative energy resolution as a function of energy for single pions as simulated with BRAHMS.

Figure 6: Energy resolution, using different estimators, for the process e^+e^− → HZ at 500 GeV center of mass energy, where the Z boson decays hadronically, while the Higgs boson decays into two W bosons which in turn decay leptonically. The histograms represent the relative difference between true and measured energy using tracks alone (dotted line), calorimetric clusters alone (dashed line) and the energy flow (full line).

Instrumented mask and forward luminosity calorimeter

The standard calorimeters ECAL and HCAL are completed by forward calorimeters, which cover polar angles down to 4.6 mrad. These calorimeters, despite their small size, have a large impact on the overall detector performance, since they enhance missing energy resolution, provide electron/photon identification and measure single bunch luminosity.

The Low Angle Tagger (LAT) is designed at the tips of the tungsten mask with a θ coverage down to ∼30 mrad and serves as an additional shield to protect the tracking detectors from backscattered particles. Its design foresees a tungsten sampling calorimeter. It is supported by an inactive tungsten structure. BRAHMS simulations assume radial and azimuthal segmentations for this device. The background expected from e^+e^− beamstrahlung pairs is comparatively small, so that the LAT can probably be used for (electron, photon) and muon identification and measurement.

The Low Angle Calorimeter (LCAL) serves both as a fast luminosity monitor and as a low angle calorimeter. The current design foresees a sampling calorimeter with segmentation in the z direction and azimuthal subdivision. It has to withstand a high level of electromagnetic radiation, yet render accurate energy and angular resolutions. In Fig. 7 the placement of the two calorimeters in the mask structure is shown.

Figure 7: Design of the forward angle calorimeters, LAT and LCAL.

The expected performance of the LAT has been studied using BRAHMS responses for high energy electrons and muons. Energy and θ resolution functions for these particles were parametrised and the parameters obtained are implemented in SIMDET. Also, detection efficiencies as functions of energy and polar angle are taken into account. Since no charge information exists, electrons and positrons are interpreted as objects with unknown charge and treated as photons. Closely spaced e^+, e^− and photons are merged to a new energy flow object, while muons with sufficient energy are considered to be isolated and are given a random charge. SIMDET allows to overwrite the default energy and angular resolution parameters as well as the minimum energy needed for particle detection.

For the LCAL we expect from existing BRAHMS simulations that only e^± and photons will be measurable with energy and polar angle dependent probabilities. The resolutions expected for energetic particles in light of intense backgrounds are taken into account in SIMDET. All measured LCAL objects are interpreted as photons, since charge information is missing. Accounting for some minimum energy deposits it seems possible that the detector allows electron measurements with more than 50 GeV down to polar angles of 5 mrad.

Since the LCAL is at present only in a stage of preliminary design, the current SIMDET response simulation is simple and accounts only for relative restricted information from the full Monte Carlo program BRAHMS.

Particle identification with dE/dx

The dE/dx simulation is based on the Bethe-Bloch equation which is a universal function of βγ for all particle species. The expected dE/dx for a track is generated according to its mass and momentum using the Bethe-Bloch equation with parameters derived from the OPAL jet chamber. Then, the expected mean is smeared by an error that depends on the number of isolated samples, on the sampling length and on the error of the sampling length that results from the uncertainty of the track polar angle θ. Parameters of the dE/dx error description are based on a study with a dedicated Monte Carlo simulation [11] where individual electrons and clusters have been generated and tracked to the TPC endplate including diffusion, gas gain fluctuations and crosstalk.

The dE/dx code provides for the electron, muon, pion, kaon and proton hypothesis five signed weights of range -1 to +1. The five weights are the signed χ^2 probabilities of a track being consistent with a certain particle species. The sign of the weight corresponds to the sign of the difference dE/dxmeas − dE/dxexp, where dE/dxexp is the dE/dx value according to the Bethe-Bloch equation and dE/dxmeas is the expected dE/dx smeared with the appropriate error.

The χ^2 probabilities also include the track momentum error and are calculated by minimising the following two-dimensional variable:

χ^2 = {(dE/dx_{meas} − dE/dx_{exp})/σ(dE/dx)}^2 + {(p_{meas} − p_{exp})/σ(p)}^2

The signed weights also allow the conversion into equivalent normalised dE/dx pull values. For particle identification purposes either the ”probability frame” might be used where cuts on dE/dx weights are placed or the ”normalised dE/dx frame” could be used where cuts on some standard deviations are placed. However, there is no general preference for one or the other framework as both are fully equivalent.

Please note that the five dE/dx weights in general do not necessarily add up to one. For two different particle species, at a certain momentum, the expected dE/dx values from the Bethe- Bloch equation are identical and indistinguishable. At this cross-over point, the probabilities for both particle hypotheses are exactly equal to one.

The expected particle separation power depends on the amount of the isolated samples available per track. Usually tracks are imbedded in dense track environments (multi-hadronic jets), which reduce the number of samples significantly due to the limited double track resolution of the TPC. The program SIMDET allows to estimate the amount of overlap regions for each track by means of two-particle separation distances in the (r − ϕ) and (r − z) projections. Since each track is compared with all others, speed of computation can be governed by a step size parameter and the possibility to cut-off the comparison of tracks after a certain number of consecutive space points taking into account the spread-out of charged particles within the magnetic field.

Usage notes

SIMDET has a built in an interface to PYTHIA for internal event generation via subroutine SIPYTH. Alternatively, events generated by other programs can be used for detector simulation; subroutine SIEVTI provides an input interface to events written by subroutine LCWRITE. If the structure of the generated events does not coincide with common /PY- JETS/ of PYTHIA, subroutine SIPREP should fill the arrays K_−PY(I,...), P_−PY(I,...) and V_−PY(I,...).

To allow for initial state radiation and beamstrahlung during event generation is in the responsibility of the event generator. Subroutine SIPYTH accounts for both radiations if wanted.

In all cases, NEVENT specifies the number of events to be processed. The detector parameters used are defined in subroutine SIDETR. The naming convention is self explanatory.

After selection of all particles which might give a response in the detector (subroutine SIPART), charged particle tracking, impact parameter estimations and the covariance matrix are obtained from the subroutine SITRAK, subroutine SICDAS and subroutine SICOVM, respectively.

Detector resolution parameters for tracks are provided by the ab initio Monte Carlo program BRAHMS taking into account the complete tracking system.

Two options exist for the vertex detector (subroutine SIDCAS):

1. the APS version, based on 1.5 cm beam pipe radius

2. the CCD version, based on 1.5 cm beam pipe radius

and only the CCD version allows for the covariance matrix at present.

The calorimetric response is also based on detector studies using the ab initio Monte Carlo simulation package BRAHMS. The energy distributions of electrons and charged pions in adjacent cells were fitted and the parameters obtained are used for appropriate energy deposite simulations in the electromagnetic and hadronic calorimeters (subroutine SILEGO and subroutine SIDEPO). Afterwards, a cluster search algorithm (with some idealised assumptions) provides clusters (subroutine SICLUS I) in the ECAL as well as the HCAL. Finally, an energy flow algorithm (subroutine SIFLOW I) joins tracker and calorimeter informations such that as many single particles as possible are resolved. At this stage, the best estimate for charged particles is simply taken from the tracker, except for high energy electrons and positrons. Here, a proper weighting scheme of their tracker and calorimeter energies is applied (subroutine SI- WGHT). Particle identification on the basis of shower shapes and matching between tracker and calorimeter information in space and momentum is emulated. Finally, best estimates of the energy flow objects are established.

In the very forward direction an instrumented mask, the low-angle tagger (subroutine SILOWT), and a low-angle luminosity calorimeter (subroutine SILCAL) are included as default devices. Their preliminary responses from BRAHMS simulation are included in SIMDET.

Particles not entering the calorimeters, e.g. low-pt tracks, are rescued in subroutine SIRSCU and added to the list of energy flow objects in subroutine SISTOR.

In addition, SIMDET allows for particle identification from specific energy losses dE/dx within the TPC (steered by subroutine SIDEDX).

Background events of the type γγ → hadrons (and later also of other sources) can be overlayed to each physical event using the package hades [5]. The data card IBKG enables this option provided the name of the background file (data card BKGF) and the average number of background events to be overlayed (data card NBKG) are given by the user. Also the study of only background events is possible. Formatted background files resulting from the package GUINEA_−PIG exist for the TESLA collider at cms energies 170, 360, 500 and 800 GeV as well as for two CLIC options: the nominal CLIC parameter option with a luminosity 1.05 ˙10^{35} cm^{−2}sec^{−1} at 3 TeV and an optimised version with lower beamstrahlung and a luminosity of 0.4 ˙10^{35} cm^{−2}sec^{−1}. It is the responsibility of the user to transform these files to a local binary file using the program hades_−import.

The CLIC option of SIMDET can be enabled by the data card CLIC. If it equals 1, the process selected in subroutine SIPYTH is simulated at the predetermined cms energy, while CLIC 2 allows for beamstrahlung effects if a luminosity spectrum file is provided on the data card CLCF. This option reads the electron and positron energies as obtained from GUINEA_−PIG for a nominal beam energy of 1500 GeV. If a different energy is desired, the simulated e^+e^− energies are rescaled. In the case of invoking a luminosity spectrum file, note that the file name extension ’.info’ respectively ’.ep’ should not be given on the data card CLCF. For more details we refer to [7].

The history of the events can be monitored either completely or in a restricted form. If the data card HISTORY is enabled, the complete event history is stored as described in the generated particle record, otherwise input quantities of only stable particles are kept, with a flag of being accepted by the detector or not.

Booking of histograms is provided in subroutine SIBOOK. A few standard histograms allow to monitor the detector response. They can be optionally filled and switched off or on by the data card PLOT.

The simulation finishes by providing all measured objects in the proposed common output structure in subroutine SISTOR.

If requested, the program allows to write (unformatted/formatted) all objects in either the standard structure or in a restricted structure (best estimates only) to an external file in subroutine SIWDST so that analysis can follow externally. It also offers to produce zipped output files (patchy use selection GZIO and data card GZIO) in order to save disk space. If this option is chosen, the extension .gz is added by the program to the file name. The required package is provided with the SIMDET code.

If no external file should be written, the array VECP(I,K) is optionally filled in subroutine SIVECS which allows to use directly the physics analysis package VECSUB (a product from SLAC/DELPHI). In this case, the components 1 to 7 of the array VECP involve the quantities as described in the VECSUB-DELPHI note [12], while the originally free locations 8, 9 and 10 of this array contain now the transverse and the longitudinal impact parameters, in units of sigma, and a simple numbering of the energy flow objects accepted.

Subroutine SIFFRE reads the set of data cards with the FFREAD package. Default settings in subroutine SIINIT and/or in subroutine SIDETR might be overwritten.

A user subroutine SIUSER (IFLAG) has been added. It is called during inititialization (IFLAG=1), for each event before writing to output file (IFLAG=2) and during termination of the job (IFLAG=3).

The package exists as a CVS repository as well as PATCHY/CMZ CAR files. If the PATCHY distribution is chosen, the desired code generation is steered by ’use’ selections. For the CVS repository the selections are given as arguments to the configure script.

SIMDET selects the standard simulation code, and with NOSIMU only all stable particles without any detector response are treated. This enables physics studies at the parton or generator level.

Further PATCHY ’use’ options are:

CIRCE to allow for the beamstrahlung code,

COVMTX for the covariance matrix material,

GZIO to produce zipped output files,

IBKG to invoke additional code for background events and

CLIC for the CLIC linear collider option.

Please note that for HP platforms error handling routines are included (forced by the ’use’ selection HPUX).

Please link the CERNLIB libraries, the PYTHIA 6.1 library and, if selected, the enclosed GZIO library, as transparently illustrated by the installation script which can be used for different platforms (Linux, HP-UX, SunOS, OSF1).

A small utility package SIANAL has been added which can serve as a template for further analyses. It contains routines to open and read the SIMDET output file of the energy flow objects written formatted or unformatted. For both types also zipped files can be read. A zipped file is assumed if the file name has the extension ’.gz’. The file name is given in the command line to run SIANAL, eg. ’./sianal.bin simmdet v4.evt.gz’.

Input/Output units:

Logical unit number Default file name Contents 6 simdetv_−4.res debugging information like the history of a few events and histograms 7 user-defined input events generated by an external program 8 simdetv_−4.dat free format data card file 9 user-defined input γγ background events generated by an external program 10 user-defined CLIC luminosity spectrum file generated by an external program 11 user-defined simulated and reconstructed objects for further analysis (for zipped output the extension ’.gz’ is added automatically) 12 simdetv_−4.hist PAW histogram file

Note that the names of input and reconstructed event files as well as γγ background event and the CLIC luminosity spectrum files should be enclosed in single quotes, start with a point and end with a blank when specified. The length of all file names is restricted to 80 characters.

Program parameters and steering

In the appendices to this description, the main program parameters, user accessible COMMON blocks, data cards and the output structure are described in detail. An up-date description together with advice for their usage is also given in the SIMDET online documentation at http : //www.ifh.de/linear_−collider/users_−guide_−simdetv4.html

Acknowledgements

The authors would like to express their gratitude to M. Battaglia, K. Buesser, C. Damerell, V. Djordjadze, P. Garcia-Abia, M. Hauschild, K. Moenig, Th. Ohl, D. Schulte, N. Tesch and H. Vogt for important contributions to the present version of SIMDET and valuable discussions. We also acknowledge comments and suggestions from many people too numerous to be mentioned, which improved the program in many respects. We would also like to thank V. Blobel for providing his program package for data analysis.

Appendix A: detector parameters

The parameters of the detector are specified in subroutine SIDETR and subroutine SIFFRE. They are printed in subroutine SIPRNT for user control. Their meaning is described in the following:

FIELD field of the solenoid [Tesla]

COSCCD cos(theta) polar angle acceptance value of the CCD vertex detector COSAPS cos(theta) polar angle acceptance value of the APS vertex detector

TPCIRAD inner radius of the TPC [m] TPCORAD outer radius of the TPC [m] TPCLEN total lenght of the TPC [m] COSTPC cos(theta) polar angle acceptance value of the TPC COSTRK cos(theta) polar angle acceptance value of the total tracking system PTMINP minimum transverse momentum of a track accepted for tracking [GeV] TRKEFF track reconstruction efficiency QTRKMIS charge misinterpretation probability

COSECAL cos(theta) polar angle acceptance value of the electromagnetic calorimeter EMECAL minimum deposited energy required in the electromagnetic calorimeter [GeV] AEMRES stochastic parameter for the energy resolution in the electromagnetic calorimeter BEMRES constant parameter for the energy resolution in the electromagnetic calorimeter EPIMIS electron misinterpretation probability

COSHCAL cos(theta) polar angle acceptance value of the hadronic calorimeter EMINHA minimum deposited energy required in the hadronic calorimeter [GeV] AHARES stochastic parameter for the energy resolution in the hadronic calorimeter BHARES constant parameter for the energy resolution in the hadronic calorimeter

COSCAL cos(theta) polar angle acceptance value of the total calorimeter

COSLLAT min cos(theta) polar angle acceptance value of the low angle tagger COSULAT max cos(theta) polar angle acceptance value of the low angle tagger EMINLAT minimum deposited energy required in the low angle tagger [GeV] ALATRES stochastic parameter for the energy resolution in the low angle tagger BLATRES constant parameter for the energy resolution in the low angle tagger CLATRES cell size in theta of the low angle tagger [rad] DLATRES cell size in phi of the low angle tagger [rad]

COSLLAC min cos(theta) polar angle acceptance value of the low angle calorimeter COSULAC max cos(theta) polar angle acceptance value of the low angle calorimeter

EMUDEP averaged deposited energy of muons in the ECAL and HCAL [GeV] EMUISO min energy of muons considered of being isolated [GeV] XMUMIS muon misidentification probability

Appendix B: User accessible COMMON blocks

The most important user accessible COMMON blocks are shortly described in the following:

+KEEP, SIEVNT.
       COMMON /SIEVNT/ NEVENT, IEVENT, IEOTRI, IEORUN, IDCHAN, ECMS
      +, BKGEVT, XSECTION, CMHEAD(10)
       INTEGER ICMHEAD(10)
       EQUIVALENCE (ICMHEAD(1), CMHEAD(1))
*

NEVENT Number of events to be processed IEVENT Current event sequence number IEOTRI Flag to abort current event of non zero IEORUN Flag to terminate run of non zero IDCHAN Reaction channel identificator ECMS c.m.s. energy [GeV] BKGEVT average number of background events to be overlayed to a physical event XSECTION cross section [fb] CMHEAD Header of files (10 words, referenced in App. D and E)

+KEEP, SIUNIT.
       COMMON /SIUNIT/ LUNIN, LUNOUT, LUNDST, LUNHIS, LUNEVT, LUNDAT
      +, LUNBKG
*

LUNIN Standard input unit LUNOUT Standard output unit LUNDST Unit to write reconstructed event information LUNHIS Unit for histograms LUNEVT Unit to read generated events LUNDAT Unit for free format data cards LUNBKG Unit to read γγ → hadrons background events

+KEEP, SICONS.
       COMMON /SICONS/ PI, TWOPI, PIBY2, SMALL, RADDEG, DEGRAD
*

PI Number PI (ACOS(-1.)) TWOPI 2*PI PIBY2 PI/2.

SMALL Arbitrary small number (1.E-10) RADDEG Radian to degree conversion factor DEGRAD Degree to radian conversion factor

+KEEP, SICNTR.
       COMMON /SICNTR/ NPRTAC, NCHAPA, NACCLE, NPLOWT, NPLCAL
      +, NPARSC, NEFLOW, NGENPA
      +, LOCPRT, LOCCPA, LOCMPO, LOCLOWT, LOCLCAL
      +, LOCRSC, LOCEFL, LOCFIN
*

NGENPA Number of all particles in the event history (if IFHIST = 1) or number of only stable particles (if IFHIST = 0) NPRTAC Number of particles being accepted for simulation NCHAPA Number of charged particles NACCLE Number od particles in the lego plot NPLOWT Number of particles in the low angle tagger NPLCAL Number of particles in the the low angle luminosity calorimeter NPARSC Number of particles being rescued NEFLOW Number of energy flow objects LOCPRT Start location of particles being accepted for simulation LOCCPA Start location of charged particles LOCMPO Start location of particles in the lego plot LOCLOWT Start location of particles in the low angle tagger LOCLCAL Start location of particles in the low angle luminosity calorimeter LOCRSC Start location of particles rescued LOCEFL Start location of energy flow objects LOCFIN Start location of particles for final storage

+KEEP, SIFLAG.
       COMMON /SICONS/ IFPYTH, IFEVTI, IFPLOT, IFGZIO
      +, IFBEST, IFVECS, IFWDST, IFFORM, IFHIST
      +, IFAPS, IFCCD, IFCOVM, IFIPCT, IFBKGR
      +, IFLCAL, IFLAT, IFDEDX
*

Flags for enabling resp. disabling of detector components or program options (see App. C)

+KEEP, SIPARA.
       COMMON /SIPARA/ COSCAL, COSECAL, COSHCAL
      +, EMECAL, EMINHA
      +, EPIMIS, XMUMIS
      +, COSCCD, COSAPS, COSVTX
      +, FIELD, TPCIRAD, TPCORAD, TPCLEN, QTRKMIS
      +, TRKEFF, PTMINP, COSTRK, COSTPC
      +, AEMRES, BEMRES, AHARES, BHARES
      +, COSLLAC, COSULAC
      +, EMUDEP, EMUISO
      +, COSLLAT, COSULAT, EMINLAT
      +, ALATRES, BLATRES, CLATRES, DLATRES
*

Detector parameters (see App. A)

+KEEP, PUCPPP.
       PARAMETER (MAXOBJ=500) ! max. # of e_flow objects (=LOCFIN-LOCEFL)
       COMMON /PUCPPP/PVECP
       DOUBLE PRECISION PVECP(5, 2*MAXOBJ)
       REAL \hspace{29mm} VECP(10, 2*MAXOBJ)

       DIMENSION \hspace{17mm} IVECP(10, 2*MAXOBJ)
       EQUIVALENCE (VECP(1, 1), PVECP(1, 1))
       EQUIVALENCE (IVECP(1, 1), VECP(1, 1))
*

Working array for VECSUB package

+KEEP, PWCPPP.
       PARAMETER (NRAWS = 2000) ! working array (=LOCFIN)
       PARAMETER (NLOC = 10)
       COMMON /PWCPPP/ PP(NLOC, NRAWS)
       DIMENSION IPP(NLOC, NRAWS)
       EQUIVALENCE (IPP(1,1), PP(1,1))
*

Working array for internal particle storage

+KEEP, SILATC.
       parameter (maxlat=100) ! max. # of particles (=LOCLCAL-LOCLOWT)
       parameter (mxplat=20) ! max. # of particles/cluster
       common /silatc/ numblat(maxlat), linklat(mxplat, maxlat)
      +, efrclat(mxplat, maxlat)
*

Arrays for particle information in the LAT

+KEEP, SILEGC.
       parameter (nte=200,npe=400) ! number of theta/phi cells in em calo
       parameter (nth=100,nph=200) ! number of theta/phi cells in had calo
       common /silegc/ ecal(nte,npe),hcal(nth,nph),ical(nte,npe)
*

Lego arrays for em and hadronic calorimeter

+KEEP, SIXREF.
       parameter (mxcel=4000,mxpar=20)
       common /sixref/ ncell,idcel(mxcel),npart(mxcel)
      +, epart(mxcel,mxpar),idpar(mxcel,mxpar)
      +, iadre(nte,npe),iadrh(nth,nph)
*

Cross reference between calorimeter cell contens and generator particles

+KEEP, SICLUC.
       parameter (maxclu=500), maxcel=8000)
       common /sicluc/ nclu(maxclu),eclu(maxclu),tclu(maxclu)
      +, pclu(maxclu),eecl(maxclu),ehcl(maxclu)
      +, listc(maxcel,maxclu),ntclu)
*

Storage for the output of the cluster algorithm

+KEEP, SICLAC.
       common /siclac/ npar(maxclu),listp(mxpar,maxclu)
      +, ppar(3,maxclu),epar(mxpar,maxclu)
*

Cross reference between clusters and generator particles

+KEEP, SIFLOC.
       parameter (maxflo=500) ! max. # of e_flow objects (=LOCFIN-LOCEF)
       common /sifloc/ nflo ! number of objects
      +, ista(maxflo),ityp(maxflo) ! status and type
      +, lgen(mxpar,maxflo),ngen(maxflo) ! mothers
      +, frac(mxpar,maxflo) ! fraction per mother
      +, pbst( 6,maxflo) ! best estimate
      +, ptrk(15,maxflo) ! tracker
      +, peca( 5,maxflo) ! ecal
      +, phca( 5,maxflo) ! hcal
      +, pmus( 6,maxflo) ! muon system
      +, ltrk(mxpar,maxflo),ntrk(maxflo) ! track list
      +, lcal(mxpar,maxflo),ncal(maxflo) ! cluster list
      +, lmus(mxpar,maxflo),nmus(maxflo) ! muon list
*

Storage of the results of the energy flow algorythm

+KEEP, SIBOUT.
       PARAMETER (NPLUND=1000, NWLUND=13)
       COMMON /SIBOUT/ NGENPA, BOUT(NPLUND,NWLUND)
       DIMENSION IBOUT(NPLUND,NWLUND)
       EQUIVALENCE (BOUT(1,1), IBOUT(1,1))
*

Storage array of generator particle information

+KEEP, SIENFL.
       PARAMETER (NMXEFL=500) ! max. # of e_flows
       PARAMETER (NWENFL=1000) ! max. # of words/e_flow
       COMMON /SIENFL/ NENFLO, CM(NMXEFL,NWENFL)
      +, NGENNW(NMXEFL), NTRKNW(NMXEFL)
      +, NCALNW(NMXEFL)
      +, NMUSNW(NMXEFL), NLATNW(NMXEFL)
      +, NLCANW(NMXEFL)
       DIMENSION ICM(NMXEFL,NWENFL)
       EQUIVALENCE (CM(1,1), ICM(1,1))
*

Storage array of energy flow objects (see App.D)

+KEEP, SIBSTC.
       PARAMETER (NMXBST=2010)
       COMMON /SIBSTC/ BEST(NMXBST)
       DIMENSION IBEST(NMXBST)
       EQUIVALENCE (BEST(1), IBEST(1))
*

Storage array of best energy flow object information (see App. E)

+KEEP, SIERRTRK.
       parameter (maxtrk=300) ! max. # of tracks (= LOCMPO-LOCCPA)
       common /sierrtrk/ rphitrk(maxtrk), rthetrk(maxtrk),rptitrk(maxtrk)
      +, dphitrk(maxtrk), dthetrk(maxtrk),dptotrk(maxtrk)
*

Track resolution and error for 1/p_T , θ and ϕ

+KEEP, SIMXEL.
       parameter (maxcpa=300) ! max. # of tracks (= LOCMPO-LOCCPA)
       common /simxel/ covxel(15,maxcpa), icovmtx(maxcpa)
*

Elements of the covariance matrix

+KEEP, IDEDXPAR.
       COMMON /IDEDXPAR/ DEDXPAR(5)
       DIMENSION IDEDXPAR(5)
       EQUIVALENCE (DEDXPAR(1), IDEDXPAR(1))
*

Data card parameters for dE/dx estimation

+KEEP, SIDEDXC.
       parameter (maxtpc=300) ! max. # of tracks (= LOCMPO-LOCCPA)
       parameter (maxpnt=1000) ! max. # of space points per track
       common /sidedxc/ RATIO(maxtpc)
      +, TRK_P(maxtpc,maxpnt,3), STEP, INDCUT
      +, RLENGTH(maxtpc), N_POINTS(maxtpc), P_IMP(maxtpc)
      +, P_TTT(maxtpc), ICHRG(maxtpc)
      +, RCLOSE(maxtpc), ICLOSE(maxtpc), IDEDX(maxtpc)
      +, DEDXWGT(5,maxtpc), DEDXNORM(5,maxtpc)
*

Parameters for dE/dx estimates

+KEEP, DEDXPAR.
       REAL XI,AKAPPA,XA,AA,PFAC,EXPB,PRES
       PARAMETER (XI = 0.4720818 ,
      + AKAPPA = 11.862274 ,
      + XA = 2.2334855 ,

      + AA = 0.1717262 ,
      + PFAC = 1.1292883 ,
      + EXPB = 2.3909695 ,
      + PRES = 1.0000000 )
       REAL RESOL,RESEXP,SPLEXP
       PARAMETER (RESOL = 0.52 ,
      + RESEXP = -0.47 ,
      + SPLEXP = 0.32 )
       REAL RSPLMN,DEMX
       PARAMETER (RSPLMN = 0.20 ,
      + DEMX = 250. )
*

Bethe-Bloch, resolution and protection parameters for dE/dx estimates

+KEEP, DXPROB.
       REAL DEDXE,DDEDXE,DEDXM,DDEDXM,
      + PE,PM,DPM,XM,Q,WEIGHT
       INTEGER METHOD
       COMMON /DXPROB/ DEDXE,DDEDXE,DEDXM,DDEDXM,
      + PE,PM,DPM,XM,Q,WEIGHT,METHOD
*

dE/dx weight and probability values

+KEEP, SILINK.
       COMMON /SILINK/ LVECP(NMXEFL)
*

Link to line number of particle in PYTHIA record if the VECSUB package is enabled

For the CVS structure the common blocks are given in the simdet/include subdirectories with the replacement of e.g. +KEEP, SIEVNT by sievnt.inc.

Appendix C: Data cards

This describes the SIMDET V4.01 free format data cards.

The initialized default values are given in parentheses. Note that file names should be enclosed in single quotes, start with a point and end with a blank. The length of all file names is restriced to 80 characters.

Certain obvious logical restrictions apply to the proper combination of options. For example, option ’PYTH 1’ does not allow for event reading from an external file.

Key Variable Data type Meaning NEVT NEVENT INTEGER total number of events to process (D=10) PYTH IFPYTH INTEGER 0 = no PYTHIA event generation 1 = event generation by PYTHIA without beamstrahlung 2 = event generation by PYTHIA with beamstrahlung -1 = only γγ background events (D=1) EVTI IFEVTI INTEGER 1 = event reading from an external file, written by sr LCWRITE, 0 = no event reading (D=0) GENF LUNGENF INTEGER input file name of generated events, user defined WDST IFWDST INTEGER 1 = event writing to an external file, 0 = no event writing (D=1) RECF LUNRECF INTEGER output file name of processed events, user defined FORM IFFORM INTEGER 1 = formatted output structure, 0 = unformatted output structure (D=0) GZIO IFGZIO INTEGER 1 = zipped output is enabled, 0 = no zipped otput (D=0) IBKG IFBKGR INTEGER 1 = background event reading from an external file, 0 = no background event reading (D=0) NBKG BKGEVT REAL average number of background events to be overlayed to each physical event (D=0.)

BKGF LUNBKGF INTEGER input file name of background events, user defined

CLIC IFCLIC INTEGER 0 = CLIC otion disabled 1 = CLIC option enabled without lumi spectrum file 2 = CLIC option enabled with lumi spectrum file (D=0) CLCF LUNCLCF INTEGER input file name of CLIC lumi spectrum file, user defined

BEST IFBEST INTEGER 1 = best estimates are enabled, 0 = no best estimates (D=0) VECS IFVECS INTEGER 1 = filling of the array VECP(I,K) for VECSUB only if IFBEST = 1 0 = no filling of this array (D=0) HIST IFHIST INTEGER 1 = history of the generated event to output file, 0 = only stable generated particles to output file (D=0) COVM IFCOVM INTEGER 1 = covariance matrix is enabled, 0 = no covariance matrix (D=0) IPCT IFIPCT INTEGER 1 = IP beam constraint enabled, 0 = no IP beam constraint (D=0)

Key Variable Data type Meaning PLOT IFPLOT INTEGER 1 = detector response plots are enabled, 0 = no detector response plots (D=0) APS IFAPS INTEGER 1 = pixel detector is enabled, 0 = no pixel detector (D=0) CCD IFCCD INTEGER 1 = CCD detector is enabled, 0 = no CCD detector (D=1) LCAL IFLCAL INTEGER 1 = low-angle calorimeter is enabled, 0 = no low-angle calorimeter (D=1) LAT IFLAT INTEGER 1 = low-angle tagger (instrumented mask) is enabled, 0 = no low-angle tagger (D=1) DEDX IFDEDX INTEGER 1 = dEdx information enabled, 0 = no dEdx information (D=0) 2. paramter (real): step size [cm] (D=3.0) 3. paramter (real): two-particle seperation distance in the (r − z) projection [cm] (D=1.0) 4. paramter (real): two-particle seperation distance in the (r − ϕ) projection [cm] (D=0.22) 5. paramter (integer): cut-off parameter 0 = track comparison is stopped after 5 consecutive steps 1 = complete track comparison (D=0) EFTR TRKEFF REAL measurement track efficiency (D=0.99) PTTR PTMINP REAL min transverse momentum required [GeV] (D=0.10) QMTR QTRKMIS REAL charge misinterpretation probability (D=0.005) EMPH EMECAL REAL min energy required for photon detection [GeV](D=0.200) EPIM EPIMIS REAL electron misidentification probability (D=0.002) AEMR AEMRES REAL first energy resolution parameter for ECAL (D=0.145) BEMR BEMRES REAL second (constant) energy resolution parameter for ECAL (D=0.015) EMHA EMINHA REAL min energy required for hadron detection in HCAL, [GeV] (D=0.500) AHAR AHARES REAL first energy resolution parameter for HCAL (D=0.554) BHAR BHARES REAL second (constant) energy resolution parameter for HCAL (D=0.166) ELAT EMINLAT REAL min energy required for particle detection in LAT [GeV] (D=5.0) ALAT ALATRES REAL first energy resolution parameter for LAT (D=0.10) BLAT BLATRES REAL second (constant) energy resolution parameter for LAT (D=0.01) CLAT CLATRES REAL theta angular resolution in LAT [rad] (D=0.04) DLAT DLATRES REAL phi angular resolution in LAT [rad] (D=0.262)

EMMU EMUDEP REAL deposited muon energy in calorimeters [GeV] (D=3.8) EMIS EMUISO REAL min energy for isolated muons [GeV] (D=5.0) XMUM XMUMIS REAL muon misidentification probability (D=0.005)

Appendix D: Full output structure

This describes the SIMDET V4.01 standard output structure.

The output file starts with a single file header of 10 words. Each event starts with the number of generated particles NGENPA, which is followed by a record of 13 words for each particle. According to the user’s choice, the whole event history (HIST 1) or only the stable particles which might give a response in the detector are covered.

The number of energy flow objects, NEFLOW, then follows. For each object, blocks of records follow, describing status information, best estimates, generator information, charged particles, calorimeter clusters and muons from the muon system, in this order.

File header record:

Offset Variable name Data type Meaning 1 INSTATE INTEGER ISR flag, PYTHIA default: 0 = no radiation, 1 = ISR & Beamstrahlung, 2 = ISR only, 3 = Beamstrahlung 2 SQRTS REAL nominal collider cms energy [GeV] 3 SIGMA REAL Cross section [fb], if provided 4 IDCLASS INTEGER Reaction identifier, user defined 5 NEVENT INTEGER Number of events to be processed 6 IFBEST INTEGER Flag for best estimates 7 IFFORM INTEGER Flag for formatted output 8 IFDEDX INTEGER Flag for dEdx 9 IFHIST INTEGER Flag for complete (restricted) event history 10 IFBKGR INTEGER Flag for background events

This record is written once per file.

Generated particle record:

Offset Variable name Data type Meaning 1 STATUS INTEGER 0 = no detector response, 1 = detector response 2 ID INTEGER particle code according to PYTHIA convention 3 line INTEGER line number of particle in the PYTHIA record 4 Px REAL x-component of momentum [GeV] 5 Py REAL y-component of momentum [GeV] 6 Pz REAL z-component of momentum [GeV] 7 E REAL Energy [GeV] 8 m REAL mass of particle [GeV] 9 Q REAL charge of particle 10 x REAL x-component of vertex [mm] 11 y REAL y-component of vertex [mm] 12 z REAL z-component of vertex [mm] 13 Time REAL time of production [mm/c]

This record is repeated NGENPA times.

Energy flow record 1: status of energy flow object

Offset Variable name Data type Meaning 1 STATUS INTEGER < 0: invalid object, 1=charged object, 2=neutral object, 3=composite object 2 Type INTEGER particle code according to PYTHIA convention, 999 = cluster of unresolvable particles 3 NGEN INTEGER number of generator particles contributing to the energy flow object 4 NTRK INTEGER number of charged particles contributing to the energy flow object 5 NCAL INTEGER number of clusters contributing to the energy flow object 6 NMUS INTEGER number of muons contributing to the energy flow object

This record and the following blocks are repeated NEFLOW times.

Energy flow record 2: best estimate for object’s energy and direction

Offset Variable name Data type Meaning 1 Px REAL x-component of momentum [GeV] 2 Py REAL y-component of momentum [GeV] 3 Pz REAL z-component of momentum [GeV] 4 E REAL Energy [GeV] 5 m REAL mass of particle [GeV] 6 Q REAL charge of particle

This record is written once per energy flow object.

Energy flow record 3: generator particle contributing to energy flow object

Offset Variable name Data type Meaning 1 link INTEGER line number of particle in the PYTHIA record 2 Efrac REAL energy fraction

This record is repeated NGEN times.

Energy flow record 4: charged particle tracks that are part of the object

Offset Variable name Data type Meaning 1 P REAL absolute value of momentum [GeV] 2 Theta REAL polar angle [radian] 3 Phi REAL azimuth angle [radian] 4 Q REAL charge of particle 5 Imp(R,phi) REAL transverse impact parameter [cm] 6 Imp(R,z) REAL longitudinal impact parameter [cm] 7 cov. matrix REAL xy-xy element 8 cov. matrix REAL xy-z element 9 cov. matrix REAL z-z element 10 cov. matrix REAL xy-theta element 11 cov. matrix REAL z-theta element 12 cov. matrix REAL theta-theta element 13 cov. matrix REAL xy-phi element 14 cov. matrix REAL z-phi element 15 cov. matrix REAL phi-theta element 16 cov. matrix REAL phi-phi element 17 cov. matrix REAL xy-1/p element 18 cov. matrix REAL z-1/p element 19 cov. matrix REAL theta-1/p element 20 cov. matrix REAL phi-1/p element 21 cov. matrix REAL 1/p-1/p element 22 dEdx REAL signed electron probability 23 dEdx REAL signed muon probability 24 dEdx REAL signed pion probability 25 dEdx REAL signed kaon probability 26 dEdx REAL signed proton probability 27 dEdx REAL normalised electron dEdx value 28 dEdx REAL normalised muon dEdx value 29 dEdx REAL normalised pion dEdx value 30 dEdx REAL normalised kaon dEdx value 31 dEdx REAL normalised proton dEdx value

This record is repeated NTRK times.

Energy flow record 5: calorimeter cluster (ECAL/HCAL/LAT/LCAL) that are part of the object

Offset Variable name Data type Meaning 1 E REAL energy [GeV] 2 Theta REAL polar angle [radian] 3 Phi REAL azimuth angle [radian] 4 Time REAL timing information 5 C(em) REAL probability of being consistent with an electromagnetic particle 6 E REAL energy [GeV] 7 Theta REAL polar angle [radian] 8 Phi REAL azimuth angle [radian] 9 Time REAL timing information 10 C(mip) REAL probability of being consistent with a minimum ionizing particle

This record is repeated NCAL times.

Energy flow record 6: muons from the muon system that are part of the object

Offset Variable name Data type Meaning 1 E REAL energy [GeV] 2 Theta REAL polar angle [radian] 3 Phi REAL azimuth angle [radian] 4 Q REAL charge of particle 5 Time REAL timing information 6 C(punch) REAL probability of being consistent with an punch-through object

This record is repeated NMUS times.

Appendix E: Restricted output structure

This describes the SIMDET V4.01 restricted output structure, mainly intended to save disc space for reconstructed events. The output file starts with a single file header of 10 words. Each event starts with the number of energy flow objects, NEFLOW. This is followed by a series of records for each energy flow object, which describe only the best estimate of the object’s energy and direction, in analogy to energy flow record 2 from the full data format, supplementerd by impact parameter information.

File header record:

Offset Variable name Data type Meaning 1 INSTATE INTEGER ISR flag, PYTHIA default: 0 = no radiation, 1 = ISR & Beamstrahlung, 2 = ISR only, 3 = Beamstrahlung 2 SQRTS REAL nominal collider cms energy [GeV] 3 SIGMA REAL Cross section [fb], if provided 4 IDCLASS INTEGER Reaction identifier, user defined 5 NEVENT INTEGER Number of events to be processed 6 IFBEST INTEGER Flag for best estimates 7 IFFORM INTEGER Flag for formatted output 8 IFDEDX INTEGER Flag for dEdx information 9 IFHIST INTEGER Flag for complete (restricted) event history 10 IFBKGR INTEGER Flag for background events

This record is written once per file.

Energy flow record:

Offset Variable name Data type Meaning 1 Px REAL best estimate for x-component of momentum [GeV] 2 Py REAL best estimate for y-component of momentum [GeV] 3 Pz REAL best estimate for z-component of momentum [GeV] 4 E REAL best estimate for energy [GeV] 5 m REAL mass of particle [GeV] 6 Q REAL charge of particle 7 Imp(R,phi) REAL transverse impact parameter, in units of sigma 8 Imp(R,z) REAL longitudinal impact parameter, in units of sigma 9 NTRK INTEGER number of charged particles contributing to the energy flow object 10 type INTEGER particle code according to PYTHIA convention, 999 = cluster of unresolvable particles

In cases of NTRK > 1, the largest impact parameters are recorded. This record is repeated NEFLOW times.

References

[1] F. Richard, J.R. Schneider, D. Trines and A. Wagner Edts., TESLA: The Superconducting Electron-Positron linear Collider with an Integrated X-Ray Laser Laboratory. Technical Design Report, Part IV A Detector for TESLA, DESY 2001-011 and ECFA 2001-209 (2001)

[2] GEANT, Detector Description and Simulation Tool, CERN Program Library Long Write-up W5013 (1994)

[3] T. Behnke, G. Blair, K. Mönig and M. Pohl, BRAHMS - Version 1.00, a Monte Carlo Program for a Detector at a 800 GeV Linear Collider, November 6, 1998,

http://www.hep.ph.rhbnc.ac.uk/~blair/detsim/brahms.html

[4] T. Ohl, IKDA 96/13-rev., July 1996 and hep-ph/9607454-rev.

[5] D. Schulte and /afs/cern.ch/eng/tev\_phys/user1/hades/src

[6] H. Vogt, Proceedings of the Linear Collider Workshop 2000, LCWS 2000, Fermilab, October 24-28, 2000

[7] M. Battaglia and /afs/cern.ch/eng/tev\_phys/public/simdet/v2.0

[8] V. Blobel, Package for constraint least squares and error propagation, private communication

[9] R. Brinkmann, G. Materlik, J. Rossbach and A. Wagner Edts., Conceptual Design of a 500 GeV e^+e^− Linear Collider with Integrated X-ray Laser Facility, DESY 1997-048 and ECFA 1997-182 (1997)

[10] M. Pohl and H.J. Schreiber, DESY 99-030, March 1999

[11] M. Gruwe, Studies of dE/dx Capabilities of a TPC for the Future Linear Collider TESLA, LC-DET-2001-043, 2001;

M. Hauschild, Proceedings of the Linear Collider Workshop 2000, LCWS 2000, Fermilab, October 24-28, 2000

[12] G. Wormser, DELPHI note, November 16, 1988; revised by P. Roudeau, September 11, 1989